<template>
  <el-dialog title="仪器维护记录" append-to-body :visible.sync="visible" width="85%">

    <el-row :gutter="10" class="mb8">
      <el-col :span="1.5">
        <el-button
          type="primary"
          plain
          icon="el-icon-plus"
          size="mini"
          @click="handleAdd"
          v-hasPermi="['check:record:add']"
        >新增</el-button>
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="success"
          plain
          icon="el-icon-edit"
          size="mini"
          :disabled="single"
          @click="handleUpdate"
          v-hasPermi="['check:record:edit']"
        >修改</el-button>
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="danger"
          plain
          icon="el-icon-delete"
          size="mini"
          :disabled="multiple"
          @click="handleDelete"
          v-hasPermi="['check:record:remove']"
        >删除</el-button>
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="warning"
          plain
          icon="el-icon-download"
          size="mini"
          @click="handleExport"
          v-hasPermi="['check:record:export']"
        >导出</el-button>
      </el-col>
    </el-row>

    <el-table v-loading="loading" :data="recordList" @selection-change="handleSelectionChange" :height="clientHeight" border>
      <el-table-column type="selection" width="55" align="center" />
      <el-table-column label="仪器类型编号" align="center" prop="code"/>
      <el-table-column label="仪器类型名称" align="center" prop="name"/>
      <el-table-column label="仪器型号" align="center" prop="model"/>
      <el-table-column label="维护内容" align="center" prop="content" />
      <el-table-column label="检定/校准单位" align="center" prop="unit" />
      <el-table-column label="检定/校准证书编号" align="center" prop="certificate" />
      <el-table-column label="备注" align="center" prop="remarks" />
      <el-table-column label="操作" align="center" class-name="small-padding fixed-width">
        <template slot-scope="scope">
          <el-button
            size="mini"
            type="text"
            icon="el-icon-edit"
            @click="handleUpdate(scope.row)"
            v-hasPermi="['check:record:edit']"
          >修改</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-delete"
            @click="handleDelete(scope.row)"
            v-hasPermi="['check:record:remove']"
          >删除</el-button>
        </template>
      </el-table-column>
    </el-table>

    <pagination
      v-show="total>0"
      :total="total"
      :page.sync="queryParams.pageNum"
      :limit.sync="queryParams.pageSize"
      @pagination="getList"
    />

    <!-- 添加或修改仪器维护记录对话框 -->
    <el-dialog :title="title" :visible.sync="open" width="800px" append-to-body>
      <el-form ref="form" :model="form" :rules="rules" label-width="130px">
        <el-form-item label="仪器" prop="instrumentId">
          <el-select v-model="form.instrumentId" placeholder="请选择仪器" disabled clearable size="small" style="width: 100%">
            <el-option
              v-for="dict in instrumentList"
              :key="dict.id"
              :label="dict.name"
              :value="dict.id"
            />
          </el-select>
        </el-form-item>
        <el-form-item label="维护内容">
          <el-input v-model="form.content" placeholder="请输入维护内容"/>
        </el-form-item>
        <el-form-item label="检定/校准单位" prop="unit">
          <el-input v-model="form.unit" placeholder="请输入检定/校准单位" />
        </el-form-item>
        <el-form-item label="检定/校准证书编号" prop="certificate">
          <el-input v-model="form.certificate" placeholder="请输入检定/校准证书编号" />
        </el-form-item>
        <el-form-item label="备注" prop="remarks">
          <el-input v-model="form.remarks" placeholder="请输入备注" />
        </el-form-item>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button type="primary" @click="submitForm">确 定</el-button>
        <el-button @click="cancel">取 消</el-button>
      </div>
    </el-dialog>
  </el-dialog>
</template>

<script>
import { listRecord, getRecord, delRecord, addRecord, updateRecord } from "@/api/check/record";
import {getAllInstrument} from "@/api/check/instrument";

export default {
  name: "Record",
  data() {
    return {
      row:{},
      instrumentList:[],
      visible: false,
      // 页面高度
      clientHeight:600,
      // 遮罩层
      loading: true,
      // 选中数组
      ids: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: false,
      // 总条数
      total: 0,
      // 仪器维护记录表格数据
      recordList: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize: 10,
        instrumentId: null,
        content: null,
        unit: null,
        certificate: null,
        remarks: null,
        deptId: null,
        createrCode: null,
        createdate: null,
        updaterCode: null,
        updatedate: null
      },
      // 表单参数
      form: {},
      // 表单校验
      rules: {
      }
    };
  },
  created() {
  },
  methods: {
    init(row) {
      this.recordList=[];
      console.log(row)
      this.row=row
      this.visible = true
      getAllInstrument().then(response=>{
        this.instrumentList=response.data;
      });
      this.queryParams.instrumentId=row.id;
      this.getList();
    },
    /** 查询仪器维护记录列表 */
    getList() {
      this.loading = true;
      listRecord(this.queryParams).then(response => {
        this.recordList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        id: null,
        instrumentId: null,
        content: null,
        unit: null,
        certificate: null,
        remarks: null,
        deptId: null,
        delFlag: null,
        createrCode: null,
        createdate: null,
        updaterCode: null,
        updatedate: null
      };
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      this.resetForm("queryForm");
      this.handleQuery();
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map(item => item.id)
      this.single = selection.length!==1
      this.multiple = !selection.length
    },
    /** 新增按钮操作 */
    handleAdd() {
      this.reset();
      this.form.instrumentId=this.row.id
      console.log(this.form.instrumentId)
      this.open = true;
      this.title = "添加仪器维护记录";
    },
    /** 修改按钮操作 */
    handleUpdate(row) {
      this.reset();
      const id = row.id || this.ids
      getRecord(id).then(response => {
        this.form = response.data;
        this.open = true;
        this.title = "修改仪器维护记录";
      });
    },
    /** 提交按钮 */
    submitForm() {
      this.$refs["form"].validate(valid => {
        if (valid) {
          if (this.form.id != null) {
            updateRecord(this.form).then(response => {
              this.$modal.msgSuccess("修改成功");
              this.open = false;
              this.getList();
            });
          } else {
            addRecord(this.form).then(response => {
              this.$modal.msgSuccess("新增成功");
              this.open = false;
              this.getList();
            });
          }
        }
      });
    },
    /** 删除按钮操作 */
    handleDelete(row) {
      const ids = row.id || this.ids;
      this.$modal.confirm('是否确认删除仪器维护记录编号为"' + ids + '"的数据项？').then(function() {
        return delRecord(ids);
      }).then(() => {
        this.getList();
        this.$modal.msgSuccess("删除成功");
      }).catch(() => {});
    },
    /** 导出按钮操作 */
    handleExport() {
      this.download('check/record/export', {
        ...this.queryParams
      }, `仪器维护记录_${new Date().getTime()}.xlsx`)
    }
  }
};
</script>
