<template>
  <el-dialog :title="$t('检验记录')" :visible.sync="visible" width="1200px" append-to-body>
    <el-table v-loading="loading" :data="checkList" @selection-change="handleSelectionChange" :height="clientHeight" border>
<!--      <el-table-column :label="$t('创建人')" align="center" prop="createrCode" :show-overflow-tooltip="true"/>-->

      <el-table-column :label="$t('检验单位')" align="center" prop="checkUnit" />
      <el-table-column :label="$t('定期检验日期')" align="center" prop="warnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.warnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column :label="$t('下次定期检验日期')" align="center" prop="nextWarnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.nextWarnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column :label="$t('定期检验报告编号')" align="center" prop="reportNo" />
      <el-table-column v-if="[1,2].includes(this.devType)" :label="$t('年度检查日期')" align="center" prop="yearWarnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.yearWarnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column v-if="[1,2].includes(this.devType)" :label="$t('年度检查结论')" align="center" prop="checkConclusion" />
      <el-table-column v-if="[1,2].includes(this.devType)" :label="$t('下次年度检查日期')" align="center" prop="yearNextWarnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.yearNextWarnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column v-if="[1,2].includes(this.devType)" :label="$t('年度检查报告编号')" align="center" prop="yearReportNo" />
      <el-table-column v-if="this.devType == 4" :label="$t('本次外部检测日期')" align="center" prop="outWarnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.outWarnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column v-if="this.devType == 4" :label="$t('下次外部检测日期')" align="center" prop="outNextWarnDate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.outNextWarnDate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column v-if="this.devType == 4" :label="$t('外部检验结论')" align="center" prop="outCheckConclusion" />
      <el-table-column v-if="this.devType == 4" :label="$t('外部检验编号')" align="center" prop="outReportNo" />
      <el-table-column :label="$t('安全等级')" align="center" prop="safeClass" />
      <el-table-column :label="$t('录入时间')" align="center" prop="createdate" width="100">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.createdate, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
<!--      <el-table-column :label="$t('操作')" align="center" fixed="right" width="120" class-name="small-padding fixed-width">-->
<!--        <template slot-scope="scope">-->
<!--          <el-button-->
<!--            size="mini"-->
<!--            type="text"-->
<!--            icon="el-icon-edit"-->
<!--            @click="handleUpdate(scope.row)"-->
<!--          >{{ $t('修改') }}</el-button>-->
<!--          <el-button-->
<!--            size="mini"-->
<!--            type="text"-->
<!--            icon="el-icon-delete"-->
<!--            @click="handleDelete(scope.row)"-->
<!--          >{{ $t('删除') }}</el-button>-->
<!--        </template>-->
<!--      </el-table-column>-->
    </el-table>

    <pagination
      v-show="total>0"
      :total="total"
      :page.sync="queryParams.pageNum"
      :limit.sync="queryParams.pageSize"
      @pagination="getList"
    />
  </el-dialog>
</template>

<script>
  import {addCheck, delCheck, exportCheck, getCheck, importTemplate, listCheck, updateCheck} from "@/api/sems/check";
  import {treeselect} from "@/api/system/dept";
  import {getToken} from "@/utils/auth";
  import Treeselect from "@riophae/vue-treeselect";
  import "@riophae/vue-treeselect/dist/vue-treeselect.css";

  export default {
  name: "Check",
  components: { Treeselect },
  data() {
    return {
      devType: null,
      // 遮罩层
      loading: true,
      visible: false,
      // 选中数组
      ids: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: false,
      // 总条数
      total: 0,
      // 特种设备检验记录表格数据
      checkList: [],
      // 弹出层标题
      title: "",
      // 部门树选项
      deptOptions: undefined,
      clientHeight:300,
      // 是否显示弹出层
      open: false,
        // 用户导入参数
        upload: {
            // 是否显示弹出层（用户导入）
            open: false,
            // 弹出层标题（用户导入）
            title: "",
            // 是否禁用上传
            isUploading: false,
            // 是否更新已经存在的用户数据
            updateSupport: 0,
            // 设置上传的请求头部
            headers: { Authorization: "Bearer " + getToken() },
            // 上传的地址
            url: process.env.VUE_APP_BASE_API + "/sems/check/importData"
        },
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize: 20,
        createrCode: null,
        createdate: null,
        updaterCode: null,
        updatedate: null,
        checkUnit: null,
        warnDate: null,
        nextWarnDate: null,
        reportNo: null,
        yearWarnDate: null,
        checkConclusion: null,
        yearNextWarnDate: null,
        yearReportNo: null,
        outWarnDate: null,
        outNextWarnDate: null,
        outCheckConclusion: null,
        outReportNo: null,
        devId: null,
        devType: null,
        safeClass: null
      },

      // 表单参数
      form: {},
      // 表单校验
      rules: {
      }
    };
  },
  watch: {
        // 根据名称筛选部门树
        deptName(val) {
            this.$refs.tree.filter(val);
        }
   },
  created() {
      //设置表格高度对应屏幕高度
      this.$nextTick(() => {
          this.clientHeight = document.body.clientHeight -250
      })
    this.getTreeselect();
  },
  methods: {
    init (row, type) {
      this.visible = true
      this.queryParams.devId = row.id
      this.queryParams.devType = type
      this.devType = type
      console.log(this.devType)
      this.loading = true;
      this.$nextTick(() => {
        console.log(this.queryParams)
        listCheck(this.queryParams).then(response => {
          this.checkList = response.rows;
          this.total = response.total;
          this.loading = false;
        });
      })

    },
    /** 查询特种设备检验记录列表 */
    getList() {
      this.loading = true;
      listCheck(this.queryParams).then(response => {
        this.checkList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
     /** 查询部门下拉树结构 */
     getTreeselect() {
          treeselect().then(response => {
              this.deptOptions = response.data;
          });
     },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        id: null,
        delFlag: null,
        createrCode: null,
        createdate: null,
        updaterCode: null,
        updatedate: null,
        checkUnit: null,
        warnDate: null,
        nextWarnDate: null,
        reportNo: null,
        yearWarnDate: null,
        checkConclusion: null,
        yearNextWarnDate: null,
        yearReportNo: null,
        outWarnDate: null,
        outNextWarnDate: null,
        outCheckConclusion: null,
        outReportNo: null,
        devId: null,
        devType: null,
        safeClass: null
      };
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      this.resetForm("queryForm");
      this.handleQuery();
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map(item => item.id)
      this.single = selection.length!==1
      this.multiple = !selection.length
    },
    /** 新增按钮操作 */
    handleAdd() {
      this.reset();
      this.open = true;
      this.title =this.$t('添加')+this.$t('特种设备') +this.$t('空格')+this.$t('检验记录');
    },
    /** 修改按钮操作 */
    handleUpdate(row) {
      this.reset();
      const id = row.id || this.ids
      getCheck(id).then(response => {
        this.form = response.data;
        this.open = true;
        this.title = this.$t('修改')+this.$t('特种设备') +this.$t('空格')+this.$t('检验记录');
      });
    },
    /** 提交按钮 */
    submitForm() {
      this.$refs["form"].validate(valid => {
        if (valid) {
          if (this.form.id != null) {
            updateCheck(this.form).then(response => {
              this.msgSuccess(this.$t('修改成功'));
              this.open = false;
              this.getList();
            });
          } else {
            addCheck(this.form).then(response => {
              this.msgSuccess(this.$t('新增成功'));
              this.open = false;
              this.getList();
            });
          }
        }
      });
    },
    /** 删除按钮操作 */
    handleDelete(row) {
      const ids = row.id || this.ids;
      this.$confirm(this.$t('是否确认删除?'), this.$t('警告'), {
        confirmButtonText: this.$t('确定'),
        cancelButtonText: this.$t('取消'),
          type: "warning"
        }).then(function() {
          return delCheck(ids);
        }).then(() => {
          this.getList();
          this.msgSuccess(this.$t('删除成功'));
        })
    },
    /** 导出按钮操作 */
    handleExport() {
      const queryParams = this.queryParams;
      this.$confirm(this.$t('是否确认导出所有特种设备检验记录数据项?'), this.$t('警告'), {
        confirmButtonText: this.$t('确定'),
        cancelButtonText: this.$t('取消'),
          type: "warning"
        }).then(function() {
          return exportCheck(queryParams);
        }).then(response => {
          this.download(response.msg);
        })
    },
      /** 导入按钮操作 */
      handleImport() {
          this.upload.title = this.$t('用户导入');
          this.upload.open = true;
      },
      /** 下载模板操作 */
      importTemplate() {
          importTemplate().then(response => {
              this.download(response.msg);
          });
      },
      // 文件上传中处理
      handleFileUploadProgress(event, file, fileList) {
          this.upload.isUploading = true;
      },
      // 文件上传成功处理
      handleFileSuccess(response, file, fileList) {
          this.upload.open = false;
          this.upload.isUploading = false;
          this.$refs.upload.clearFiles();
          this.$alert(response.msg, this.$t('导入结果'), { dangerouslyUseHTMLString: true });
          this.getList();
      },
      // 提交上传文件
      submitFileForm() {
          this.$refs.upload.submit();
      }
  }
};
</script>
